100 1000 10000 100000 1000000 1

10

100

1000

g(f)

Hz g(f) ASFRequenzgang (User) Fit of frequenzgang D"g(f)"

Modell

ASFRequenzga ng (User)

Gleichung

V/((1+1/(f/O1)^(2*(n1)))^(1/2)*(1+ (f/O2)^(2*(n2)))^(1/2))

Chi-Quadr Reduziert

308,2355

Kor. R-Quadrat 0,99471 Wert Standardfehler

g(f)

V 1037,02982 8,51228 O1 1031,0537 6,082 O2 47080,54569 315,29497 n1 5,05703 0,05676 n2 4,9794 0,06036

Diagramm 1: Frequenzgang